It has been reported that due care is not taken by you while discharging your job responsibilities. An allegation of” In Work negligence & policy violation (Not following the key policy locker key not handover to a branch when on leave and sleeping in branch during working hours) is violating the Code of conduct has been made against you. Such practices lead to the departmental integrity issue and against the company's code of conduct”).