1. It has been reported that due care is not taken by you while discharging your job responsibilities. An allegation of” In disciplinary issue & Work negligence (Switch off the mobile and not responding to superiors during working hours) is violating the Code of conduct has been made against you. Such practices lead to the departmental integrity issue and against the company's code of conduct”).
Based on Fact ZIC members has decided to close this case with Warning letter, same approved through Mail.